\documentclass[12pt]{article}
\pagestyle{empty}\usepackage[latin1]{inputenc}
\usepackage[dvips,a4paper,body={16.5cm,22.9cm},noheadfoot]{geometry} % Comment out if letter
%\usepackage[dvips,letterpaper,body={16.5cm,22.9cm},noheadfoot]{geometry} %Comment out if A4
\usepackage{showframe} % uncomment this if you want to draw frames on
		       % each page
% Our own skiplength and section definitions 
\newcommand{\myskip}{\vspace{\baselineskip}}
\newcommand{\mysection}[1]{\par\myskip\noindent\textbf{#1}\myskip\par}
\begin{document}
\begin{center}
{\large\textbf{Preparation of Camera-ready Manuscripts}} 

\myskip 
Jan Ku\v{c}era\\
Institute of Physics, Academy of Sciences of the Czech Republic\\
Cukrovarnická 10, 162~53~{}~Praha~6, Czech Repubic

\myskip 
\mysection{Abstract}

\myskip 
\parbox{4.5in}{Instructions are provided for the preparation
               of the camera-ready version of the manuscript 
               for the EP2DS-14 Workbook. The important features
               are emphasized.}
\end{center}
\mysection{Introduction}
In order to expedite the printing of the Conference Workbook, all
authors should follow these simple guidelines regarding the layout of
the Camera-ready manuscript. The instructions are given in the
following section.

\mysection{Instructions}
The Camera-ready version of your manuscript should be identical to the
PHYSICA~E version. It should be typed (or word processed) on good
quality A4- or letter-size paper inside a rectangular area
16.5 cm $\times$ 22.9 cm (6.5"$\times$9"), \textit{i.e.}, inside a border on this
sheet. Note that the line defining this border is shown only for
guidance and should not be reproduced in your version.

The font to be used is your choice but it should not be smaller than 12pt.
It is advisable to use a standard font, e.g. Times or Computer Modern
(this document).
If you are using a typewriter (not likely these days\ldots{}), 
the text should be typed in a standard typewriter font with no more
than 10 characters per inch. Note that one 1~inch $\approx$ 2.54 cm.

The camera-ready version of the manuscript should be \textbf{single spaced}
with references numbered consecutively in brackets [1] (parentheses, if
brackets are not available). All figures should be sized appropriately so
that the entire manuscript including 
     title, 
     authors, 
     affiliation, 
     abstract,
     text,
     equations, 
     references, 
     figures,
     tables,
     figure and 
     table captions 
is contained in less than 4 pages. Authors
presenting 30-minute talks may extend their manuscripts to 6 or 8
pages.

The author is indebted to Prof.\ L.\ Eaves who created an analogous
document, on a similar occassion.
\mysection{References} % We define our own...
\newlength{\mydescr}
\settowidth{\mydescr}{[1]}
\begin{list}{}%
{\setlength{\labelwidth}{\mydescr}%
\setlength{\leftmargin}{\parindent}%
\setlength{\topsep}{0pt}%
\setlength{\itemsep}{0pt}}
\item [\textrm{[1]}] References should be grouped at the end of the text in numerical.
\item [\textrm{[2]}] Authors should also read the  instructions on the Conference
Website.
\end{list} 

\end{document}




