Preparation of Camera-ready Manuscripts

Jan Kučera Institute of Physics, Academy of Sciences of the Czech Republic Cukrovarnická 10, 162 53 Praha 6, Czech Repubic

Abstract

Instructions are provided for the preparation of the cameraready version of the manuscript for the EP2DS-14 Workbook. The important features are emphasized.

Introduction

In order to expedite the printing of the Conference Workbook, all authors should follow these simple guidelines regarding the layout of the Camera-ready manuscript. The instructions are given in the following section.

Instructions

The Camera-ready version of your manuscript should be identical to the PHYSICA E version in contents. It should be typed (or word processed) on good quality A4- or letter-size paper inside a rectangular area 16.5 cm × 22.9 cm (6.5”×9”), i.e., inside a border on this sheet. Note that the line defining this border is shown only for guidance and should not be reproduced in your version.

The font to be used is your choice but it should not be smaller than 12pt. It is advisable to use a standard font, e.g. Times or Computer Modern (this document). If you are using a typewriter (not likely these days. . . ), the text should be typed in a standard typewriter font with no more than 10 characters per inch. Note that one 1 inch ≈ 2.54 cm.

The camera-ready version of the manuscript should be single spaced with references numbered consecutively in brackets [1] (parentheses, if brackets are not available). All figures should be sized appropriately so that the entire manuscript including title, authors, affiliation, abstract, text, equations, references, figures, tables, figure and table captions is contained in less than 4 pages. Authors presenting 30-minute talks may extend their manuscripts to 6 or 8 pages.

The author is indebted to Prof. L. Eaves who created an analogous document, on a similar occassion.

References

[1] References should be grouped at the end of the text in numerical. [2] Authors should also read the instructions on the Conference Website.